860 870 880 890 900 910 920 930 940 950 960

56558 56560 56562 56564 56566 56568 56570 56572 nanoseconds

Modified Julian Day

GPS Common-View Time-Transfer between ATNF Parkes and NMI Sydney

Tue Oct 08 22:26:10 2013

Parkes SAO Maser - Epoch UTC(AUS) Linearly Fitted Daily Averages

3e-14

4e-14

5e-14

6e-14

7e-14

8e-14

9e-14

1e-13

1.1e-13

56558 56560 56562 56564 56566 56568 56570 56572

Fractional Frequency Offset

Modified Julian Day

GPS Common-View Frequency Transfer between ATNF Parkes and NMI Sydney

Tue Oct 08 22:26:10 2013

Fractional Frequency Offset between Parkes SAO Maser and the NFS